\hypertarget{timlCNNLinearParamsDefault_8c}{\section{timl\-C\-N\-N\-Linear\-Params\-Default.\-c File Reference}
\label{timlCNNLinearParamsDefault_8c}\index{timl\-C\-N\-N\-Linear\-Params\-Default.\-c@{timl\-C\-N\-N\-Linear\-Params\-Default.\-c}}
}
{\ttfamily \#include \char`\"{}../api/timl.\-h\char`\"{}}\\*
\subsection*{Functions}
\begin{DoxyCompactItemize}
\item 
\hyperlink{structtimlCNNLinearParams}{timl\-C\-N\-N\-Linear\-Params} \hyperlink{group__cnn_gad5c8fd10f11ccaa8142a665fc8ee93b8}{timl\-C\-N\-N\-Linear\-Params\-Default} ()
\begin{DoxyCompactList}\small\item\em Return the default parameters for the linear layer. \end{DoxyCompactList}\end{DoxyCompactItemize}
