\hypertarget{timlUtilVectorResetFloat_8c}{\section{timl\-Util\-Vector\-Reset\-Float.\-c File Reference}
\label{timlUtilVectorResetFloat_8c}\index{timl\-Util\-Vector\-Reset\-Float.\-c@{timl\-Util\-Vector\-Reset\-Float.\-c}}
}
{\ttfamily \#include \char`\"{}../api/timl.\-h\char`\"{}}\\*
\subsection*{Functions}
\begin{DoxyCompactItemize}
\item 
int \hyperlink{group__util_ga4c8737cc28dfcafb340a06869cb06c6d}{timl\-Util\-Vector\-Reset\-Float} (float $\ast$a, int m, float val, int device\-Id, int thread\-Id)
\begin{DoxyCompactList}\small\item\em Reset a float vector. \end{DoxyCompactList}\end{DoxyCompactItemize}
